en	Status Report

en	Get a status report about your site's operation and any detected problems.

en	Here you can find a short overview of your site's parameters as well as any problems detected with your installation. It may be useful to copy and paste this information into support requests filed on TYPO3's support mailinglists and project issue trackers.

en	OK

en	Insecure

en	Disabled

en	Enabled

en	Enabled permanently

en	Enabled temporarily

en	Empty

en	None

en	Connection Failed

en	Update Complete

en	Update Incomplete

en	One or more problems were detected with your TYPO3 installation. Please check the %sstatus report%s for more information.

en	TYPO3 System

en	System

en	Security

en	Configuration

en	Reference Index

en	File Abstraction Layer

en	Files flagged as missing

en	%1$s files

en	These files are flagged as missing. Restore the files and run the indexer to reset the missing flag.

en	Memcached Configuration

en	PHP safe_mode

en	PHP magic_quotes_gpc

en	Permissions of created files

en	Files created by TYPO3 are configured to be world writable. Depending on your server configuration, this can be a security risk. It is usually better to configure the create mask to not allow writing to files by "others". A sane default is often '0660' for $GLOBALS['TYPO3_CONF_VARS']['SYS']['fileCreateMask']. This can be set in the install tool.

en	Permissions of created directories

en	Directories created by TYPO3 are configured to be world writable. Depending on your server configuration, this can be a security risk. It is usually better to configure the create mask to not allow writing to directories by "others". A sane default is often '2770' for $GLOBALS['TYPO3_CONF_VARS']['SYS']['folderCreateMask']. This can be set in the install tool.

en	Trusted Hosts Pattern

en	Admin User Account

en	Encryption Key

en	Backend user password hashes

en	During the configuration check of saltedpasswords the following issues have been found:

en	Some backend user passwords are found to be only md5 hashed. Run the scheduler task to convert all passwords to salted hashes.

en	File Deny Pattern

en	.htaccess Upload Protection

en	Install Tool Password

en	Install Tool

en	PHP Version

en	Your PHP installation is too old.

en	PHP Memory Limit

en	Depending on your configuration, TYPO3 can run with a %1$s PHP memory limit. However, a %2$s PHP memory limit or above is recommended, especially if your site uses additional extensions.

en	Depending on your configuration, TYPO3 can run with a %1$s PHP memory limit. However, a %2$s PHP memory limit or above is required especially if your site uses additional extensions.

en	Increase the memory limit by editing the memory_limit parameter in the file %s and then restart your web server (or contact your system administrator or hosting provider for assistance).

en	Contact your system administrator or hosting provider for assistance with increasing your PHP memory limit.

en	unlimited

en	PHP peak memory usage

en	During a request %2$s of the memory limit was used. On %4$s a request to %5$s used %1$s of %3$s.

en	Clear this flag

en	PHP Register Globals

en	%s is enabled. TYPO3 requires this configuration directive to be disabled.

en	Your site may not be secure when %s is enabled.

en	how to change configuration settings

en	The PHP manual has instructions for %s.

en	Web Server

en	For your Web Server some notifications have been found:

en	Fluid uses complex regular expressions which require a lot of stack space during the first processing. On Windows the default stack size for Apache is a lot smaller than on unix. You can increase the size to 8MB (default on unix) by adding to the httpd.conf: <br />&lt;IfModule mpm_winnt_module&gt; <br />ThreadStackSize 8388608 <br />&lt;/IfModule&gt; <br />Restart Apache after this change.

en	PHP Modules

en	One or more modules are missing.

en	The following PHP module(s) is/are missing: %s.

en	You need to install and enable these modules to let TYPO3 function correctly.

en	one of: %s

en	All required modules are installed.

en	The Install Tool is temporarily enabled. Delete the file "%s" when you have finished setting up TYPO3. If not used the Install Tool will be disabled automatically in %s minutes.

en	Deprecation Log

en	The deprecation log tracks whether old APIs are being used in extensions. Depending on the extensions you use and whether they use deprecated APIs it can happen that the log takes up quite some space over time. The more space it takes up, the more it may affect your installation's performance. It is recommended to disable deprecation log in production environments.

en	You can find the deprecation log file at %s.

en	Your deprecation log file currently takes up %s.

en	Delete deprecation log file.

en	The deprecation log file was successfully deleted.

en	The deprecation log file could not be deleted!

en	PHP INI setting safe_mode "On" is deprecated since PHP 5.3 and is not supported by TYPO3 anymore.

en	PHP INI setting magic_quotes_gpc "On" is deprecated since PHP 5.3. You are advised to set it to "Off" until it gets completely removed.

en	System Status Update

en	Runs a system status check and sends notifications if problems have been found.

en	Notification Email Address

en	Notification Email Addresses (one per line)

en	Empty or invalid notification email address.

en	Empty or invalid notification email addresses.

en	System Status Notification for site %s

en	Site

en	Issues

en	Old XCLASS method used

en	Old XCLASS method is used in %d cases:

en	The old XCLASS registration does not work since TYPO3 CMS version 6.0. This is not necessarily a bad thing, the registration might be done by an extension author to keep compatibility with older TYPO3 CMS versions. Please check the affected extension for TYPO3 CMS 6.0 compatibility to verify whether this is a problem for you.

en	XCLASS used

en	Your system registers XCLASS

en	XCLASS can overwrite methods or classes of the core or other extensions. This is not necessarily a bad thing, but those XCLASS might break during extension or core upgrades. You should keep an eye on extension compatibility and make sure the intended functionality is still given after updates.

en	%2$s registers an XCLASS of %1$s

en	Extension compatibility6

en	Extension compatibility6 is loaded. You should check that every third-party extension is natively compatible with this version of TYPO3 and then unload this compatibility extension. As long as this compatibility extension is loaded, you will suffer performance drawbacks