en	htmlArea RTE

en	htmlArea RTE is a free, open-source editor for <textarea> fields featuring tight integration with TYPO3.

en	htmlArea RTE supports the following browsers: Firefox 1.5+, SeaMonkey 1.0+, Safari 3.0.4+, Google Chrome 1.0+ and Opera 9.62+ on any platform, and Internet Explorer 9.0+ on Windows.

en	xEXT_rtehtmlarea_General:beUserSettings, xEXT_rtehtmlarea_EditElement, xEXT_rtehtmlarea_Language, xEXT_rtehtmlarea_PlainText, xEXT_rtehtmlarea_RemoveFormat

en	BE User settings

en	BE User settings let you specify some options of the RTE.

en	xEXT_rtehtmlarea_General:rteWidth,xEXT_rtehtmlarea_General:rteHeight,xEXT_rtehtmlarea_General:rteResize,xEXT_rtehtmlarea_General:rteMaxHeight,xEXT_rtehtmlarea_PlainText:behaviour,_MOD_user_setup

en	Default width of the RTE in px or %

en	This option lets you specify the initial width of the RTE.

en	The option specifies the width of the RTE when it is initially displayed. The width may be specified as a fixed number of pixels or as a percentage.

en	Default height of the RTE in px

en	This option lets you specify the initial height of the RTE.

en	The option specifies the height of the RTE when it is initially displayed. The height of the RTE must be specified as a fixed number of pixels not as a percentage. The value you set should allow sufficient height for the tool bar, the editing area and the status bar of the RTE.

en	Make RTE resizable

en	This option will make RTE-enabled fields resizable. A resize handle will appear at the bottom right corner of the RTE.

en	Maximal height of resizeable RTE in pixels

en	The value you set should allow sufficient height for the tool bar, the editing area and the status bar of the RTE. Default value is 2000.